UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20201, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52001 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20201, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52002 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20201, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52003 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20201, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52004 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20201, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52005 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20205, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52006 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20205, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52007 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20205, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52008 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20205, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52009 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20205, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52010 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20209, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52011 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20209, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52012 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20209, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52013 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20209, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52014 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20209, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52015 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20202, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52016 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20202, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52017 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20202, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52018 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20202, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52019 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20202, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52020 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20206, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52021 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20206, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52022 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20206, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52023 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20206, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52024 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20206, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52025 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20210, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52026 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20210, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52027 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20210, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52028 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20210, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52029 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20210, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52030 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20204, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52031 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20204, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52032 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20204, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52033 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20204, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52034 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20204, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52035 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20208, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52036 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20208, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52037 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20208, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52038 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20208, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52039 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20208, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52040 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20212, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52041 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20212, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52042 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20212, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52043 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20212, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52044 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20212, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52045 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20203, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52046 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20203, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52047 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20203, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52048 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20203, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52049 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20203, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52050 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20207, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52051 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20207, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52052 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20207, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52053 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20207, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52054 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20207, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52055 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20211, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52056 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20211, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52057 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20211, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52058 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20211, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52059 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20211, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52060 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20213, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52061 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20213, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52062 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20213, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52063 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20213, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52064 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20213, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52065 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20214, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52066 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20214, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52067 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20214, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52068 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20214, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52069 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20214, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52070 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20215, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52071 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20215, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52072 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20215, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52073 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20215, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52074 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20215, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52075 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20216, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52076 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20216, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52077 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20216, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52078 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20216, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52079 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20216, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52080 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20217, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52081 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20217, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52082 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20217, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52083 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20217, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52084 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20217, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52085 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20218, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52086 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20218, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52087 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20218, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52088 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20218, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52089 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20218, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52090 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20223, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52091 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20223, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52092 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20223, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52093 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20223, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52094 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20223, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52095 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20224, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52096 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20224, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52097 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20224, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52098 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20224, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52099 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20224, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52100 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20225, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52101 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20225, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52102 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20225, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52103 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20225, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52104 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20225, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52105 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20228, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52106 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20228, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52107 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20228, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52108 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20228, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52109 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20228, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 52110 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20229, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 63, `applyvalue2` = 3 WHERE `vnum` = 52111 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20229, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 66, `applyvalue2` = 3 WHERE `vnum` = 52112 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20229, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 1, `applyvalue2` = 250 WHERE `vnum` = 52113 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20229, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 54, `applyvalue2` = 50 WHERE `vnum` = 52114 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20229, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 53, `applyvalue2` = 30 WHERE `vnum` = 52115 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20230, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 63, `applyvalue2` = 5 WHERE `vnum` = 52116 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20230, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 66, `applyvalue2` = 5 WHERE `vnum` = 52117 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20230, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 1, `applyvalue2` = 500 WHERE `vnum` = 52118 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20230, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 54, `applyvalue2` = 150 WHERE `vnum` = 52119 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20230, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 53, `applyvalue2` = 100 WHERE `vnum` = 52120 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20253, `applytype1` = 8, `applyvalue1` = 10, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 56000 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20110, `applytype1` = 54, `applyvalue1` = 100, `applytype2` = 66, `applyvalue2` = 10 WHERE `vnum` = 71115 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20111, `applytype1` = 54, `applyvalue1` = 150, `applytype2` = 66, `applyvalue2` = 10 WHERE `vnum` = 71117 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20112, `applytype1` = 54, `applyvalue1` = 200, `applytype2` = 66, `applyvalue2` = 10 WHERE `vnum` = 71119 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20113, `applytype1` = 53, `applyvalue1` = 300, `applytype2` = 66, `applyvalue2` = 10 WHERE `vnum` = 71121 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20114, `applytype1` = 66, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71124 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20115, `applytype1` = 63, `applyvalue1` = 20, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71125 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20116, `applytype1` = 15, `applyvalue1` = 10, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71126 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20117, `applytype1` = 15, `applyvalue1` = 10, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71127 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20118, `applytype1` = 65, `applyvalue1` = 10, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71128 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20119, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71131 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20119, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71132 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20119, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71133 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20119, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71134 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20120, `applytype1` = 66, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71137 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20121, `applytype1` = 66, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71138 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20122, `applytype1` = 66, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71139 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20123, `applytype1` = 66, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71140 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20124, `applytype1` = 66, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71141 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20125, `applytype1` = 66, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71142 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20219, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71161 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20220, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71164 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20221, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71165 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20222, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71166 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20227, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71171 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20226, `applytype1` = 8, `applyvalue1` = 60, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71172 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20231, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71176 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20232, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71177 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20233, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71182 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20234, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71183 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20235, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71184 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20236, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71185 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20237, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71186 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20238, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71187 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20239, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71192 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20240, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71193 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20241, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71197 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20242, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71198 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20243, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71220 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20244, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71222 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20245, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71223 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20246, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71224 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20247, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71225 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20248, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71226 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20249, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71227 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20250, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71228 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20251, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71229 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20252, `applytype1` = 8, `applyvalue1` = 25, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71230 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20254, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71231 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20255, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71232 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20257, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71233 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20258, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71234 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20259, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71235 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20260, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71236 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20110, `applytype1` = 54, `applyvalue1` = 75, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71237 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20111, `applytype1` = 54, `applyvalue1` = 100, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71238 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20112, `applytype1` = 54, `applyvalue1` = 125, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71239 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20113, `applytype1` = 53, `applyvalue1` = 200, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71240 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20030, `applytype1` = 0, `applyvalue1` = 0, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 71241 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20261, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71242 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20262, `applytype1` = 63, `applyvalue1` = 15, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71243 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20263, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71244 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20264, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 1, `applyvalue2` = 1500 WHERE `vnum` = 71245 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20265, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71246 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20266, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71247 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20267, `applytype1` = 1, `applyvalue1` = 1500, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71248 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20268, `applytype1` = 1, `applyvalue1` = 1500, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71249 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20269, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71250 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20270, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71251 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20271, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71252 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20272, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 63, `applyvalue2` = 15 WHERE `vnum` = 71253 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20273, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 214, `applyvalue2` = 10 WHERE `vnum` = 71254 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20274, `applytype1` = 8, `applyvalue1` = 20, `applytype2` = 214, `applyvalue2` = 10 WHERE `vnum` = 71255 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20275, `applytype1` = 86, `applyvalue1` = 15, `applytype2` = 87, `applyvalue2` = 20 WHERE `vnum` = 71256 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20275, `applytype1` = 86, `applyvalue1` = 15, `applytype2` = 87, `applyvalue2` = 20 WHERE `vnum` = 71257 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20275, `applytype1` = 86, `applyvalue1` = 100, `applytype2` = 214, `applyvalue2` = 50 WHERE `vnum` = 71258 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20276, `applytype1` = 1, `applyvalue1` = 1500, `applytype2` = 66, `applyvalue2` = 30 WHERE `vnum` = 71259 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20277, `applytype1` = 239, `applyvalue1` = 10, `applytype2` = 241, `applyvalue2` = 10 WHERE `vnum` = 71260 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20250, `applytype1` = 8, `applyvalue1` = 30, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 91056 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20246, `applytype1` = 8, `applyvalue1` = 40, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 91057 LIMIT 1;
UPDATE `item_proto` SET `type` = 28, `subtype` = 2, `applytype0` = 118, `applyvalue0` = 20252, `applytype1` = 8, `applyvalue1` = 50, `applytype2` = 0, `applyvalue2` = 0 WHERE `vnum` = 91058 LIMIT 1;
